diff --git a/all_tables.sql b/all_tables.sql
index 0510e25..b796224 100644
--- a/all_tables.sql
+++ b/all_tables.sql
@@ -47,6 +47,23 @@
     updated_at TIMESTAMP DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间'
 ) ENGINE=InnoDB COMMENT='用户表';
 
+-- 邮箱验证表
+CREATE TABLE email_verifications (
+    id INT AUTO_INCREMENT PRIMARY KEY COMMENT '验证ID',
+    email VARCHAR(100) NOT NULL COMMENT '邮箱地址',
+    code VARCHAR(255) NOT NULL COMMENT '验证码',
+    type ENUM('register', 'reset_password', 'email_change') NOT NULL COMMENT '验证类型',
+    user_id INT DEFAULT NULL COMMENT '用户ID（找回密码时使用）',
+    is_verified BOOLEAN DEFAULT FALSE COMMENT '是否已验证',
+    expires_at TIMESTAMP NOT NULL COMMENT '过期时间',
+    created_at TIMESTAMP DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
+    verified_at TIMESTAMP NULL DEFAULT NULL COMMENT '验证时间',
+    INDEX idx_email_code (email, code),
+    INDEX idx_email_type (email, type),
+    INDEX idx_expires_at (expires_at),
+    FOREIGN KEY (user_id) REFERENCES users(id) ON DELETE CASCADE
+) ENGINE=InnoDB COMMENT='邮箱验证表';
+
 -- 标签表
 CREATE TABLE tags (
     id INT AUTO_INCREMENT PRIMARY KEY COMMENT '标签ID',
