diff --git a/src/pages/NotFoundPage.jsx b/src/pages/NotFoundPage.jsx
new file mode 100644
index 0000000..8c174f2
--- /dev/null
+++ b/src/pages/NotFoundPage.jsx
@@ -0,0 +1,20 @@
+import React from 'react';
+import { Button, Result } from 'antd';
+import { Link } from 'react-router-dom';
+
+const NotFoundPage = () => {
+  return (
+    <Result
+      status="404"
+      title="404"
+      subTitle="抱歉，您访问的页面不存在。"
+      extra={
+        <Button type="primary">
+          <Link to="/">返回首页</Link>
+        </Button>
+      }
+    />
+  );
+};
+
+export default NotFoundPage;
\ No newline at end of file
