diff --git a/src/pages/Tool/Swagger/index.tsx b/src/pages/Tool/Swagger/index.tsx
new file mode 100644
index 0000000..adcc968
--- /dev/null
+++ b/src/pages/Tool/Swagger/index.tsx
@@ -0,0 +1,31 @@
+import React, { useEffect } from 'react';
+
+/**
+ *
+ * @author whiteshader@163.com
+ *
+ * */
+
+const CacheInfo: React.FC = () => {
+  useEffect(() => {
+    const frame = document.getElementById('bdIframe');
+    if (frame) {
+      const deviceWidth = document.documentElement.clientWidth;
+      const deviceHeight = document.documentElement.clientHeight;
+      frame.style.width = `${Number(deviceWidth) - 260}px`;
+      frame.style.height = `${Number(deviceHeight) - 120}px`;
+    }
+  });
+
+  return (
+    <div style={{}}>
+      <iframe
+        style={{ width: '100%', border: '0px', height: '100%' }}
+        src={`/api/swagger-ui/index.html`}
+        id="bdIframe"
+      />
+    </div>
+  );
+};
+
+export default CacheInfo;
