diff --git a/src/pages/ForumPage.jsx b/src/pages/ForumPage.jsx
new file mode 100644
index 0000000..9734ab5
--- /dev/null
+++ b/src/pages/ForumPage.jsx
@@ -0,0 +1,19 @@
+import React from 'react';
+import './ForumPage.css';
+
+const ForumPage = () => {
+  return (
+    <div className="forum-container">
+      <h1>论坛</h1>
+      <div className="forum-post">
+        <h2>示例帖子标题</h2>
+        <p>这是一个示例帖子内容，用于测试论坛页面的显示效果。</p>
+      </div>
+      <div className="forum-comment">
+        <p>示例评论内容：这是一条测试评论。</p>
+      </div>
+    </div>
+  );
+};
+
+export default ForumPage;
\ No newline at end of file
