diff --git a/src/pages/AuthPage/AuthPage.jsx b/src/pages/AuthPage/AuthPage.jsx
index 4c51ff9..64f3378 100644
--- a/src/pages/AuthPage/AuthPage.jsx
+++ b/src/pages/AuthPage/AuthPage.jsx
@@ -67,8 +67,9 @@
     if (data.msg === "登录成功" && data.user) {
       // 保存用户信息到 localStorage
       localStorage.setItem("user", JSON.stringify(data.user));
-      localStorage.setItem("userId", data.user.id); // 如果有 id 字段
-      window.location.href = '/forum';
+      localStorage.setItem("userId", data.user.userId); // 如果有 id 字段
+      debugger
+      // window.location.href = '/forum';
     } else {
       throw new Error(data.msg || "登录失败");
     }
